0

1 0

2 0

3 0

4 0

5 0

6 0

7 0

NUMBEROFSTATIONS

2 0 4 0 6 0 8 0 1 0 0 1 2 0

Figure 3. Number of HCDN stations by record length.

LENGTHOFRECORDWITHACCEPTABLEDATA,INWATERYEARS

1 5