0

5 0 0

1 0 0 0

1 5 0 0

NUMBEROFSTATIONS

1 8 7 0 1 8 9 0 1 9 1 0 1 9 3 0 1 9 5 0 1 9 7 0 1 9 9 0

Figure5.NumberofHCDNstationswithacceptabledataforagivenwateryear.

WATERYEAR

1 7