-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-10

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-20

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-30

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-40

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-50

-74˚ 00'

-74˚ 00'

-73˚ 30'

-73˚ 30'

-73˚ 00'

-73˚ 00'

-72˚ 30'

-72˚ 30'

-72˚ 00'

-72˚ 00'

-71˚ 30'

-71˚ 30'

40˚ 30' 40˚ 30'

40˚ 45' 40˚ 45'

41˚ 00' 41˚ 00'

41˚ 15' 41˚ 15'

41˚ 30' 41˚ 30'

Long Island Sound Region Bathymetry