-600

-550

-500

-450

-400

-350

-300

-250

-200

-150

-100 -50 0 50 100 150 200 250 300 350 400 450 500 550 600 650 700 750 nanoteslas

USGS - Residual Aeromagnetic Map - Area 6

90˚W 89˚30´W 89˚W

90˚W 89˚30´W 89˚W

44˚N

44˚30´N

44˚N

44˚30´N

0 10 20 30 40 50 KM