-3000

-3000

-2800

-2800

-2600

-75˚ 50'

-75˚ 50'

-75˚ 40'

-75˚ 40'

-75˚ 30'

-75˚ 30'

-75˚ 20'

-75˚ 20'

31˚ 40' 31˚ 40'

31˚ 50' 31˚ 50'

32˚ 00' 32˚ 00'

ODP 995

ODP 994

ODP 997

92-21

92-8 92-7

L8f2

Area of fig. 8

500

500

1000

1000

1500

1500

2000

2500

3000

3500

2000

4000